[#NodeClock-to_time_t-00]
= xref:NodeClock.adoc[NodeClock]::to&lowbar;time&lowbar;t
:relfileprefix: ../
:mrdocs:

== Synopsis

Declared in `&lt;util&sol;time&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;nodiscard&rsqb;&rsqb;
static
time&lowbar;t
to&lowbar;time&lowbar;t(time&lowbar;point const& &lowbar;&lowbar;t) noexcept;
----

== Return Value

[NOTE]
====
The return value https://en.cppreference.com/cpp/language/attributes/nodiscard[should not be discarded^].
====

[.small]#Created with https://www.mrdocs.com[MrDocs]#
