[#NodeClock-now]
= xref:NodeClock.adoc[NodeClock]::now
:relfileprefix: ../
:mrdocs:

Return current system time or mocked time, if set&period;

== Synopsis

Declared in `&lt;util&sol;time&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
xref:NodeClock/time_point.adoc[time&lowbar;point]
now() noexcept;
----

== Return Value

The current node time, mocked when a mock time is set&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
