[#MempoolAcceptResult-m_vsize]
= xref:MempoolAcceptResult.adoc[MempoolAcceptResult]::m&lowbar;vsize
:relfileprefix: ../
:mrdocs:

Virtual size as used by the mempool, calculated using serialized size and sigops&period;

== Synopsis

Declared in `&lt;validation&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
std::optional&lt;int64&lowbar;t&gt; const m&lowbar;vsize;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
