[#MEMPOOL_HEIGHT]
= MEMPOOL&lowbar;HEIGHT
:mrdocs:

Fake height value used in Coin to signify they are only in the memory pool (since 0&period;8)

== Synopsis

Declared in `&lt;txmempool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr uint32&lowbar;t MEMPOOL&lowbar;HEIGHT = 0x7FFFFFFF;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
