[#MEMPOOL_FEE_ESTIMATOR_MAX_TARGET]
= MEMPOOL&lowbar;FEE&lowbar;ESTIMATOR&lowbar;MAX&lowbar;TARGET
:mrdocs:

Maximum confirmation target, in blocks, for which the mempool estimator is reliable&period;

== Synopsis

Declared in `&lt;policy&sol;fees&sol;mempool&lowbar;estimator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr int MEMPOOL&lowbar;FEE&lowbar;ESTIMATOR&lowbar;MAX&lowbar;TARGET = &lcub;2&rcub;;
----

== Description

Estimates for a confirmation target above this are not reliable, as mempool conditions are likely to change&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
