[#MAX_STACK_SIZE]
= MAX&lowbar;STACK&lowbar;SIZE
:mrdocs:

Maximum number of values on the script interpreter stack&period;

== Synopsis

Declared in `&lt;script&sol;script&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr int MAX&lowbar;STACK&lowbar;SIZE = 1000;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
