[#MAX_SCRIPT_VERIFY_FLAGS_BITS]
= MAX&lowbar;SCRIPT&lowbar;VERIFY&lowbar;FLAGS&lowbar;BITS
:mrdocs:

Number of defined verification flag bits, equal to the value of SCRIPT&lowbar;VERIFY&lowbar;END&lowbar;MARKER&period;

== Synopsis

Declared in `&lt;script&sol;interpreter&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr int MAX&lowbar;SCRIPT&lowbar;VERIFY&lowbar;FLAGS&lowbar;BITS = static&lowbar;cast&lt;int&gt;(SCRIPT&lowbar;VERIFY&lowbar;END&lowbar;MARKER);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
