[#MAX_PUBKEYS_PER_MULTI_A]
= MAX&lowbar;PUBKEYS&lowbar;PER&lowbar;MULTI&lowbar;A
:mrdocs:

The limit of keys in OP&lowbar;CHECKSIGADD&hyphen;based scripts&period; It is due to the stack limit in BIP342&period;

== Synopsis

Declared in `&lt;script&sol;script&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr unsigned int MAX&lowbar;PUBKEYS&lowbar;PER&lowbar;MULTI&lowbar;A = 999;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
