[#MAX_OUTBOUND_FULL_RELAY_CONNECTIONS]
= MAX&lowbar;OUTBOUND&lowbar;FULL&lowbar;RELAY&lowbar;CONNECTIONS
:mrdocs:

Maximum number of automatic outgoing nodes over which we&apos;ll relay everything (blocks, tx, addrs, etc)

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr int MAX&lowbar;OUTBOUND&lowbar;FULL&lowbar;RELAY&lowbar;CONNECTIONS = 8;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
