[#MAX_OPCODE]
= MAX&lowbar;OPCODE
:mrdocs:

Maximum value that an opcode can take&period;

== Synopsis

Declared in `&lt;script&sol;script&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr unsigned int MAX&lowbar;OPCODE = OP&lowbar;NOP10;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
