[#MAX_FEATUREID_LENGTH]
= MAX&lowbar;FEATUREID&lowbar;LENGTH
:mrdocs:

Maximum length in bytes of a feature identifier in a feature message&period;

== Synopsis

Declared in `&lt;protocol&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr size&lowbar;t MAX&lowbar;FEATUREID&lowbar;LENGTH = &lcub;80&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
