[#MAX_DISCONNECTED_TX_POOL_BYTES]
= MAX&lowbar;DISCONNECTED&lowbar;TX&lowbar;POOL&lowbar;BYTES
:mrdocs:

Maximum bytes for transactions to store for processing during reorg

== Synopsis

Declared in `&lt;kernel&sol;disconnected&lowbar;transactions&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr unsigned int MAX&lowbar;DISCONNECTED&lowbar;TX&lowbar;POOL&lowbar;BYTES = &lcub;20&apos;000&apos;000&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
