[#MAX_DBCACHE_BYTES]
= MAX&lowbar;DBCACHE&lowbar;BYTES
:mrdocs:

Maximum total database cache on current architecture (bytes)

== Synopsis

Declared in `&lt;kernel&sol;caches&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr uint64&lowbar;t MAX&lowbar;DBCACHE&lowbar;BYTES = &lcub;sizeof(void&ast;) &equals;&equals; 4 ? 1&lowbar;GiB &colon; std&colon;&colon;numeric&lowbar;limits&lt;uint64&lowbar;t&gt;&colon;&colon;max()&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
