[#MAX_BLOCK_SERIALIZED_SIZE]
= MAX&lowbar;BLOCK&lowbar;SERIALIZED&lowbar;SIZE
:mrdocs:

The maximum allowed size for a serialized block, in bytes (only for buffer size limits)

== Synopsis

Declared in `&lt;consensus&sol;consensus&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr unsigned int MAX&lowbar;BLOCK&lowbar;SERIALIZED&lowbar;SIZE = &lcub;4&apos;000&apos;000&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
