[#MAX_BIP125_RBF_SEQUENCE]
= MAX&lowbar;BIP125&lowbar;RBF&lowbar;SEQUENCE
:mrdocs:

Highest input sequence number that still signals opt&hyphen;in replace&hyphen;by&hyphen;fee under BIP 125 (SEQUENCE&lowbar;FINAL &hyphen; 2)&period;

== Synopsis

Declared in `&lt;util&sol;rbf&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr uint32&lowbar;t MAX&lowbar;BIP125&lowbar;RBF&lowbar;SEQUENCE = &lcub;0xfffffffd&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
