[#LockedPool-ARENA_SIZE]
= xref:LockedPool.adoc[LockedPool]::ARENA&lowbar;SIZE
:relfileprefix: ../
:mrdocs:

Size of one arena of locked memory&period; This is a compromise&period; Do not set this too low, as managing many arenas will increase allocation and deallocation overhead&period; Setting it too high allocates more locked memory from the OS than strictly necessary&period;

== Synopsis

Declared in `&lt;support&sol;lockedpool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
size&lowbar;t ARENA&lowbar;SIZE = &lcub;256&ast;1024&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
