[#LOCKTIME_MAX]
= LOCKTIME&lowbar;MAX
:mrdocs:

Maximum nLockTime&period;

== Synopsis

Declared in `&lt;script&sol;script&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr uint32&lowbar;t LOCKTIME&lowbar;MAX = 0xFFFFFFFFU;
----

== Description

Since a lock time indicates the last invalid timestamp, a transaction with this lock time will never be valid unless lock time checking is disabled (by setting all input sequence numbers to SEQUENCE&lowbar;FINAL)&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
