[#HeadersSyncState-GetPresyncTime]
= xref:HeadersSyncState.adoc[HeadersSyncState]::GetPresyncTime
:relfileprefix: ../
:mrdocs:

Return the block timestamp of the last header received during the PRESYNC phase&period;

== Synopsis

Declared in `&lt;headerssync&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
uint32&lowbar;t
GetPresyncTime() const;
----

== Return Value

The timestamp of the last header received during PRESYNC&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
