[#HeadersSyncState-GetPresyncHeight]
= xref:HeadersSyncState.adoc[HeadersSyncState]::GetPresyncHeight
:relfileprefix: ../
:mrdocs:

Return the height reached during the PRESYNC phase

== Synopsis

Declared in `&lt;headerssync&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int64&lowbar;t
GetPresyncHeight() const;
----

== Return Value

The height of the last header processed during PRESYNC&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
