[#HTTPVersion-major]
= xref:HTTPVersion.adoc[HTTPVersion]::major
:relfileprefix: ../
:mrdocs:

Default HTTP protocol version 1&period;1 is used by error responses when a request is unreadable&period;

== Synopsis

Declared in `&lt;httpserver&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
uint8&lowbar;t major = &lcub;1&rcub;;
----

== Description

@&lcub;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
