[#HTTPServer-SetServerTimeout]
= xref:HTTPServer.adoc[HTTPServer]::SetServerTimeout
:relfileprefix: ../
:mrdocs:

Set the idle client timeout (&hyphen;rpcservertimeout)

== Synopsis

Declared in `&lt;httpserver&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
SetServerTimeout(std::chrono::seconds seconds);
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *seconds*
| Idle duration after which a client is disconnected&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
