[#GetTime-0e]
= GetTime
:mrdocs:

DEPRECATED Use either ClockType&colon;&colon;now() or Now&lt;TimePointType&gt;() if a cast is needed&period; ClockType is &hyphen; SteadyClock&sol;std&colon;&colon;chrono&colon;&colon;steady&lowbar;clock for steady time &hyphen; SystemClock&sol;std&colon;&colon;chrono&colon;&colon;system&lowbar;clock for system time &hyphen; NodeClock for mockable system time

== Synopsis

Declared in `&lt;util&sol;time&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int64&lowbar;t
GetTime();
----

== Return Value

The current node time as a Unix timestamp in seconds&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
