[#GCSFilter-Params-m_M]
= xref:GCSFilter.adoc[GCSFilter]::xref:GCSFilter/Params.adoc[Params]::m&lowbar;M
:relfileprefix: ../../
:mrdocs:

Inverse false positive rate

== Synopsis

Declared in `&lt;blockfilter&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
uint32&lowbar;t m&lowbar;M;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
