[#FEELER_INTERVAL]
= FEELER&lowbar;INTERVAL
:mrdocs:

Run the feeler connection loop once every 2 minutes&period; &ast;

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr auto FEELER&lowbar;INTERVAL = 2min;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
