[#EXTRA_BLOCK_RELAY_ONLY_PEER_INTERVAL]
= EXTRA&lowbar;BLOCK&lowbar;RELAY&lowbar;ONLY&lowbar;PEER&lowbar;INTERVAL
:mrdocs:

Run the extra block&hyphen;relay&hyphen;only connection loop once every 5 minutes&period; &ast;

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr auto EXTRA&lowbar;BLOCK&lowbar;RELAY&lowbar;ONLY&lowbar;PEER&lowbar;INTERVAL = 5min;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
