[#DEFAULT_VALIDATION_CACHE_BYTES]
= DEFAULT&lowbar;VALIDATION&lowbar;CACHE&lowbar;BYTES
:mrdocs:

Default combined size of the signature and script&hyphen;execution validation caches&period;

== Synopsis

Declared in `&lt;script&sol;sigcache&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr size&lowbar;t DEFAULT&lowbar;VALIDATION&lowbar;CACHE&lowbar;BYTES = &lcub;32&lowbar;MiB&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
