[#DEFAULT_SCRIPT_EXECUTION_CACHE_BYTES]
= DEFAULT&lowbar;SCRIPT&lowbar;EXECUTION&lowbar;CACHE&lowbar;BYTES
:mrdocs:

Default size in bytes of the script&hyphen;execution result cache&period;

== Synopsis

Declared in `&lt;script&sol;sigcache&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr size&lowbar;t DEFAULT&lowbar;SCRIPT&lowbar;EXECUTION&lowbar;CACHE&lowbar;BYTES = &lcub;DEFAULT&lowbar;VALIDATION&lowbar;CACHE&lowbar;BYTES &sol; 2&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
