[#DEFAULT_PREVOUTFETCH_THREADS]
= DEFAULT&lowbar;PREVOUTFETCH&lowbar;THREADS
:mrdocs:

Default number of worker threads used to prefetch block input prevouts&period;

== Synopsis

Declared in `&lt;kernel&sol;chainstatemanager&lowbar;opts&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr int32&lowbar;t DEFAULT&lowbar;PREVOUTFETCH&lowbar;THREADS = &lcub;8&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
