[#DEFAULT_PEER_CONNECT_TIMEOUT]
= DEFAULT&lowbar;PEER&lowbar;CONNECT&lowbar;TIMEOUT
:mrdocs:

&hyphen;peertimeout default

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr int64&lowbar;t DEFAULT&lowbar;PEER&lowbar;CONNECT&lowbar;TIMEOUT = 60;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
