[#DEFAULT_MAX_HTTP_CONNECTIONS]
= DEFAULT&lowbar;MAX&lowbar;HTTP&lowbar;CONNECTIONS
:mrdocs:

Maximum number of connected HTTP clients

== Synopsis

Declared in `&lt;httpserver&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr int DEFAULT&lowbar;MAX&lowbar;HTTP&lowbar;CONNECTIONS = 16;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
