[#DEFAULT_CHECKBLOCKS]
= DEFAULT&lowbar;CHECKBLOCKS
:mrdocs:

Default number of blocks to verify at startup (the &hyphen;checkblocks setting)&period;

== Synopsis

Declared in `&lt;validation&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr int DEFAULT&lowbar;CHECKBLOCKS = 6;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
