[#DEFAULT_BLOCKFILTERINDEX]
= DEFAULT&lowbar;BLOCKFILTERINDEX
:mrdocs:

Default value for the &hyphen;blockfilterindex option (no filter index enabled)&period;

== Synopsis

Declared in `&lt;index&sol;blockfilterindex&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr char const* DEFAULT&lowbar;BLOCKFILTERINDEX = &lcub;&quot;0&quot;&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
