[#Consensus-Params-SegwitHeight]
= xref:Consensus.adoc[Consensus]::xref:Consensus/Params.adoc[Params]::SegwitHeight
:relfileprefix: ../../
:mrdocs:

Block height at which Segwit (BIP141, BIP143 and BIP147) becomes active&period; Note that segwit v0 script rules are enforced on all blocks except the BIP 16 exception blocks&period;

== Synopsis

Declared in `&lt;consensus&sol;params&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int SegwitHeight;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
