[#Consensus-BIP9Deployment-nTimeout]
= xref:Consensus.adoc[Consensus]::xref:Consensus/BIP9Deployment.adoc[BIP9Deployment]::nTimeout
:relfileprefix: ../../
:mrdocs:

Timeout&sol;expiry MedianTime for the deployment attempt&period;

== Synopsis

Declared in `&lt;consensus&sol;params&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int64&lowbar;t nTimeout = &lcub;NEVER&lowbar;ACTIVE&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
