[#Consensus-BIP9Deployment-NO_TIMEOUT]
= xref:Consensus.adoc[Consensus]::xref:Consensus/BIP9Deployment.adoc[BIP9Deployment]::NO&lowbar;TIMEOUT
:relfileprefix: ../../
:mrdocs:

Constant for nTimeout very far in the future&period;

== Synopsis

Declared in `&lt;consensus&sol;params&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
int64&lowbar;t NO&lowbar;TIMEOUT = std&colon;&colon;numeric&lowbar;limits&lt;int64&lowbar;t&gt;&colon;&colon;max();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
