[#Consensus-BIP9Deployment-NEVER_ACTIVE]
= xref:Consensus.adoc[Consensus]::xref:Consensus/BIP9Deployment.adoc[BIP9Deployment]::NEVER&lowbar;ACTIVE
:relfileprefix: ../../
:mrdocs:

Special value for nStartTime indicating that the deployment is never active&period; This is useful for integrating the code changes for a new feature prior to deploying it on some or all networks&period;

== Synopsis

Declared in `&lt;consensus&sol;params&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
int64&lowbar;t NEVER&lowbar;ACTIVE = &hyphen;2;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
