[#Consensus-BIP9Deployment-ALWAYS_ACTIVE]
= xref:Consensus.adoc[Consensus]::xref:Consensus/BIP9Deployment.adoc[BIP9Deployment]::ALWAYS&lowbar;ACTIVE
:relfileprefix: ../../
:mrdocs:

Special value for nStartTime indicating that the deployment is always active&period; This is useful for testing, as it means tests don&apos;t need to deal with the activation process (which takes at least 3 BIP9 intervals)&period; Only tests that specifically test the behaviour during activation cannot use this&period;

== Synopsis

Declared in `&lt;consensus&sol;params&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
int64&lowbar;t ALWAYS&lowbar;ACTIVE = &hyphen;1;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
