[#CValidationInterface-2destructor]
= xref:CValidationInterface.adoc[CValidationInterface]::&#126;CValidationInterface
:relfileprefix: ../
:mrdocs:

Protected destructor so that instances can only be deleted by derived classes&period; If that restriction is no longer desired, this should be made public and virtual&period;

== Synopsis

Declared in `&lt;validationinterface&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr
&#126;CValidationInterface() = default;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
