[#CTxMemPool-m_load_tried]
= xref:CTxMemPool.adoc[CTxMemPool]::m&lowbar;load&lowbar;tried
:relfileprefix: ../
:mrdocs:

whether an attempt to load the persisted mempool has been made

== Synopsis

Declared in `&lt;txmempool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;guarded&lowbar;by(0x7f95135d1368), guarded&lowbar;by(0x7f9501b10748), guarded&lowbar;by(0x7f950ec76938), guarded&lowbar;by(0x7f9525ea6688), guarded&lowbar;by(0x7f9515095dc8), guarded&lowbar;by(0x7f950826a068), guarded&lowbar;by(0x7f94f856d778), guarded&lowbar;by(0x7f9513c57968)&rsqb;&rsqb;
bool m&lowbar;load&lowbar;tried = &lcub;false&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
