[#CTxMemPool-SetLoadTried]
= xref:CTxMemPool.adoc[CTxMemPool]::SetLoadTried
:relfileprefix: ../
:mrdocs:

Set whether or not an initial attempt to load the persisted mempool was made (regardless of whether the attempt was successful or not)

== Synopsis

Declared in `&lt;txmempool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
SetLoadTried(bool load&lowbar;tried);
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *load&lowbar;tried*
| Whether a load attempt has been made&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
