[#CTxMemPool-GetSequence]
= xref:CTxMemPool.adoc[CTxMemPool]::GetSequence
:relfileprefix: ../
:mrdocs:

Returns the current mempool sequence number without incrementing it&period;

== Synopsis

Declared in `&lt;txmempool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;requires&lowbar;capability(0x7f95135d3728), requires&lowbar;capability(0x7f9501b12b08), requires&lowbar;capability(0x7f950ec78cf8), requires&lowbar;capability(0x7f9525ea8a48), requires&lowbar;capability(0x7f9515098188), requires&lowbar;capability(0x7f950826c428), requires&lowbar;capability(0x7f94f856fb38), requires&lowbar;capability(0x7f9513c59d28)&rsqb;&rsqb;
uint64&lowbar;t
GetSequence() const;
----

== Return Value

The current sequence number&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
