[#CTxMemPool-GetLoadTried]
= xref:CTxMemPool.adoc[CTxMemPool]::GetLoadTried
:relfileprefix: ../
:mrdocs:

Report whether an initial attempt to load the persisted mempool was made&period;

== Synopsis

Declared in `&lt;txmempool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
GetLoadTried() const;
----

== Return Value

true if an initial attempt to load the persisted mempool was made, regardless of whether the attempt was successful or not


[.small]#Created with https://www.mrdocs.com[MrDocs]#
