[#CTxMemPool-ChangeSet-2destructor]
= xref:CTxMemPool.adoc[CTxMemPool]::xref:CTxMemPool/ChangeSet.adoc[ChangeSet]::&#126;ChangeSet
:relfileprefix: ../../
:mrdocs:

Destroy the changeset, aborting any staging that was not applied&period;

== Synopsis

Declared in `&lt;txmempool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;requires&lowbar;capability(0x7f95135d3a70), requires&lowbar;capability(0x7f9501b12e50), requires&lowbar;capability(0x7f950ec79040), requires&lowbar;capability(0x7f9525ea8d90), requires&lowbar;capability(0x7f95150984d0), requires&lowbar;capability(0x7f950826c770), requires&lowbar;capability(0x7f94f856fe80), requires&lowbar;capability(0x7f9513c5a070)&rsqb;&rsqb;
&#126;ChangeSet();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
