[#CThreadInterrupt-Clock]
= xref:CThreadInterrupt.adoc[CThreadInterrupt]::Clock
:relfileprefix: ../
:mrdocs:

Clock used to measure sleep durations&period;

== Synopsis

Declared in `&lt;util&sol;threadinterrupt&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
using Clock = std::chrono::steady&lowbar;clock;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
