[#CNode-m_min_ping_time]
= xref:CNode.adoc[CNode]::m&lowbar;min&lowbar;ping&lowbar;time
:relfileprefix: ../
:mrdocs:

Lowest measured round&hyphen;trip duration&period; Used as an inbound peer eviction criterion in CConnman&colon;&colon;AttemptToEvictConnection&period;

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
std::atomic&lt;NodeClock::duration&gt; m&lowbar;min&lowbar;ping&lowbar;time = &lcub;NodeClock&colon;&colon;duration&colon;&colon;max()&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
