[#CHMAC_SHA512-OUTPUT_SIZE]
= xref:CHMAC_SHA512.adoc[CHMAC&lowbar;SHA512]::OUTPUT&lowbar;SIZE
:relfileprefix: ../
:mrdocs:

Size of the HMAC&hyphen;SHA&hyphen;512 output in bytes&period;

== Synopsis

Declared in `&lt;crypto&sol;hmac&lowbar;sha512&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
size&lowbar;t OUTPUT&lowbar;SIZE = &lcub;64&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
