[#CFCHECKPT_INTERVAL]
= CFCHECKPT&lowbar;INTERVAL
:mrdocs:

Interval between compact filter checkpoints&period; See BIP 157&period;

== Synopsis

Declared in `&lt;index&sol;blockfilterindex&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr int CFCHECKPT&lowbar;INTERVAL = 1000;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
