[#CBloomFilter-IsWithinSizeConstraints]
= xref:CBloomFilter.adoc[CBloomFilter]::IsWithinSizeConstraints
:relfileprefix: ../
:mrdocs:

True if the size is &lt;&equals; MAX&lowbar;BLOOM&lowbar;FILTER&lowbar;SIZE and the number of hash functions is &lt;&equals; MAX&lowbar;HASH&lowbar;FUNCS (catch a filter which was just deserialized which was too big)

== Synopsis

Declared in `&lt;common&sol;bloom&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
IsWithinSizeConstraints() const;
----

== Return Value

true if the filter is within the protocol size constraints&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
