[#CBlockIndex-nStatus]
= xref:CBlockIndex.adoc[CBlockIndex]::nStatus
:relfileprefix: ../
:mrdocs:

Verification status of this block&period; See enum BlockStatus

== Synopsis

Declared in `&lt;chain&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;guarded&lowbar;by(0x7f9500cbe178), guarded&lowbar;by(0x7f95119057b8), guarded&lowbar;by(0x7f951ec49a38), guarded&lowbar;by(0x7f9524d79b38), guarded&lowbar;by(0x7f9503ca0408), guarded&lowbar;by(0x7f9516ce9ad8), guarded&lowbar;by(0x7f9520d77d98), guarded&lowbar;by(0x7f9524d44638), guarded&lowbar;by(0x7f9517141a08), guarded&lowbar;by(0x7f9516bbe4a8), guarded&lowbar;by(0x7f94f3859358)&rsqb;&rsqb;
uint32&lowbar;t nStatus = &lcub;0&rcub;;
----

== Description

Note&colon; this value is modified to show BLOCK&lowbar;OPT&lowbar;WITNESS during UTXO snapshot load to avoid a spurious startup failure requiring &hyphen;reindex&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
