[#BIP324Cipher-REKEY_INTERVAL]
= xref:BIP324Cipher.adoc[BIP324Cipher]::REKEY&lowbar;INTERVAL
:relfileprefix: ../
:mrdocs:

Number of packets between automatic key rotations&period;

== Synopsis

Declared in `&lt;bip324&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
unsigned int REKEY&lowbar;INTERVAL = &lcub;224&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
